Script started on Tue Sep 21 15:48:45 2004
lnx1 1> pwd
/home/phys410/maple
lnx1 2> cat tladd
############################################################
#  Tests
#     ladd
#     laddnew
############################################################
read ladd;
l1 := [1,2,3,4];
############################################################
#  Note the use of the 'printf' procedure, and the '%a'
#  format specification.
############################################################
printf("ladd(...) is %a \n", ladd(l1));
printf("laddnew(...) is %a \n", laddnew(l1));

lnx1 3> maple
    |\^/|     Maple 8 (IBM INTEL LINUX)
._|\|   |/|_. Copyright (c) 2002 by Waterloo Maple Inc.
 \  MAPLE  /  All rights reserved. Maple is a registered trademark of
 <________>  Waterloo Maple Inc.
      |       Type ? for help.
> read tladd;
                              l1 := [1, 2, 3, 4]
ladd(...) is 10
laddnew(...) is 10

> quit;
bytes used=142088, alloc=196572, time=0.05
lnx1 4> exit
exit
Script done on Tue Sep 21 15:49:03 2004